X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/e362b6f1fdd996fa1e2bfe7748ba970b853fac57..cfa074b9eb12b37a1a4aa2c3d4c5ca44f9cc74fb:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 350a303..00d85a2 100644
--- a/paper.tex
+++ b/paper.tex
@@ -32,14 +32,15 @@
   \IEEEauthorblockA{%
     FEMTO-ST Institute\\
     University of Franche-ComtÃ©\\
-    IUT de Belfort-Montb\'{e}liard, Rue Engel Gros, BP 27, 90016 Belfort, France\\
-   Fax  : (+33)~3~84~58~77~32\\
-   Email: \{jean-claude.charr, ahmed.fanfakh, raphael.couturier, arnaud.giersch\}@univ-fcomte.fr
+    IUT de Belfort-MontbÃ©liard, 19 avenue du MarÃ©chal Juin, BP 527, 90016 Belfort cedex, France\\
+    Fax  : +33~3~84~58~77~32\\
+    Email: \{jean-claude.charr, ahmed.fanfakh\_badri\_muslim, raphael.couturier, arnaud.giersch\}@univ-fcomte.fr
    }
   }
 
 \maketitle
 
+\AG{Is the fax number correct? Shall we add a telephone number?}
 \JC{Use Capital letters for only the first letter in the title of a section, table, figure, ...} 
 \begin{abstract}
   Dynamic Voltage Frequency Scaling (DVFS) can be applied to modern CPUs. 
