X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/e7ebd4d2766afa9be865d0cead8ce65fb333b53e..c6462f930984f1d5cd3a4674e0ad6dc16ad47c40:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 53a1cf7..a8629c2 100644
--- a/paper.tex
+++ b/paper.tex
@@ -208,7 +208,7 @@ selection method which has the following characteristics:
 \item It is well adapted to distributed architectures because it takes into
   account the communication time.
 \item It is well adapted to distributed applications with imbalanced tasks.
-\item it has very small footprint when compared to other methods
+\item It has very small footprint when compared to other methods
   (e.g.,~\cite{19}) and does not require profiling or training as
   in~\cite{38,34}.
 \end{enumerate}
