X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/f0308f6359a61fd5ac3468415f50349fbfc8af62..c27998e0d06b0e027640e1e8c2541f83ca72182d:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index f87dd56..eb3cd18 100644
--- a/paper.tex
+++ b/paper.tex
@@ -228,7 +228,7 @@ our paper is to present a new online scaling factor selection method which has t
 %   paper in homogeneous clusters}
 
 
-\section{Energy model for homogeneous platform}
+\section{Energy model for a homogeneous platform}
 \label{sec.exe}
 Many researchers~\cite{9,3,15,26} divide the power consumed by a processor into
 two power metrics: the static and the dynamic power.  While the first one is
