X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/f2f3e27d9d560225f78b031375f3d02f1948f9a4..7d2b5d8b8dc27be4b702a3c63174abdd62dd6670:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 72cf122..2ec1b17 100644
--- a/paper.tex
+++ b/paper.tex
@@ -16,6 +16,9 @@
 %\usepackage[font=scriptsize,labelfont=bf]{caption}
 \usepackage{lmodern}
 
+\usepackage{todonotes}
+\newcommand{\AG}[2][inline]{\todo[color=green!50,#1]{\sffamily\small\textbf{AG:} #2}}
+
 \begin{document}
 
 \title{Optimal Dynamic Frequency Scaling for Energy-Performance of Parallel MPI Programs}
