X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/0ac070873920bcf8d6092cfb1bf75ffa3eb05fcb..c0fb25a718af8f0d41ea36b83b1acf3eb63a11a4:/Heter_paper.tex

diff --git a/Heter_paper.tex b/Heter_paper.tex
index 2050d2a..66a8ac2 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -723,8 +723,7 @@ running the NAS benchmarks class C on 8 or 9 nodes are place in the tables
    \hline
     EP         &6170.30	        &16.19	       &0.02	            &16.17          \\
    \hline
-    LU         &39477.28        &20.43	       &0.07	    to changes it
-behaviour         &20.36          \\
+    LU         &39477.28        &20.43	       &0.07	            &20.36          \\
     \hline
     BT         &26169.55	    &25.34	       &6.62	            &18.71          \\
    \hline
