X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/3d5f3e882a122029ae42138304769d94b5f844e1..c502ab8a67c1f133c9f159cb4bac5cb8b8a8d947:/mpi-energy2-extension/Heter_paper.tex?ds=inline

diff --git a/mpi-energy2-extension/Heter_paper.tex b/mpi-energy2-extension/Heter_paper.tex
index 4d36639..2e0b7f7 100644
--- a/mpi-energy2-extension/Heter_paper.tex
+++ b/mpi-energy2-extension/Heter_paper.tex
@@ -117,7 +117,7 @@ scaling (DVFS) is one of them. It can be used to reduce the power consumption of
 
 \section{Introduction}
 \label{sec.intro}
-\textcolor{red}{did you verify that these informations are still accurate before changing the years to 2015?}
+
 The need for more computing power is continually increasing. To partially
 satisfy this need, most supercomputers constructors just put more computing
 nodes in their platform. The resulting platforms may achieve higher floating
