X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/453664b6bc4c3d4cfee00082a2f26ada681f08a5..4e4894da5221f2b395de5db0df84cb7ff5c719a7:/mpi-energy2-extension/Heter_paper.tex

diff --git a/mpi-energy2-extension/Heter_paper.tex b/mpi-energy2-extension/Heter_paper.tex
index ccccc7f..403272c 100644
--- a/mpi-energy2-extension/Heter_paper.tex
+++ b/mpi-energy2-extension/Heter_paper.tex
@@ -846,8 +846,6 @@ selected clusters and are presented in Table~\ref{table:grid5000}.
 \begin{figure}[!t]
   \centering
   \includegraphics[scale=0.6]{fig/power_consumption.pdf}
-  \AG{I don't understand the labels on the horizontal axis: 10:30:37, 10:30:38,
-    etc.}
   \caption{The power consumption by one core from the Taurus cluster}
   \label{fig:power_cons}
 \end{figure}
