X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/63db3888ceb38d26393ccd23243db9c4939810ad..refs/heads/master:/mpi-energy2-extension/review/review.tex?ds=inline

diff --git a/mpi-energy2-extension/review/review.tex b/mpi-energy2-extension/review/review.tex
index e7525c1..dcc6435 100644
--- a/mpi-energy2-extension/review/review.tex
+++ b/mpi-energy2-extension/review/review.tex
@@ -54,7 +54,10 @@
 
 \title{Answers to the questions of the reviewers}
 \maketitle
-\section{Questions of the first reviewer} 
+
+We would like to thank the reviewers for taking time to review our paper. Their remarks were very constructive and allowed us to improve our paper and clarify some ambiguous points. We took in consideration all the remarks of the reviewers and modified the paper accordingly. In the following sections, the reviewers can find our answers to their questions:
+
+\section{Questions and remarks of the first reviewer} 
 
 \begin{enumerate}
 
@@ -70,11 +73,11 @@ iteration. The scaling factors will not be the best tradeoff because
 variability has been ignored. What would be the solution for that?
 Consider variability in the model. 
 
-\textbf{Answer:} In this paper we have considered that the application executes regular iterations over stable computers computing only this application. Therefore, we have assumed that the execution times of all the iterations of the application executed on the same computing node should be almost the same. For this reason we did not take into consideration the variability of the computer system. Moreover, applying the frequency scaling algorithm after many iterations would reduce its impact on the energy consumption especially for applications executing a relatively low number of iterations. 
+\textbf{Answer:} In this paper we have considered that the application executes regular iterations over stable machines computing only this application. Therefore, we have assumed that the execution times of all the iterations of the application executed on the same computing node should be almost the same. For this reason we did not take into consideration the variability of the computer system. Moreover, applying the frequency scaling algorithm after many iterations would reduce its impact on the energy consumption especially for applications executing a relatively low number of iterations. 
 
 However, the variability of the computing system can be taken into consideration in a future work. For example, the proposed algorithm can be executed twice: after the first iteration the frequencies are scaled down according to the execution times measured in the first iteration, then after a fixed number of iterations, the frequencies are adjusted according to the execution times measured during the fixed number of iterations. If the  computing power of the system is constantly changing, it would be interesting to implement a mechanism that detects this change and adjusts the frequencies according to the variability of the system. 
 
- Taking account of the variability of the system has been added as a perspective at the end of the paper.
+ Taking the variability of the system into account has been added as a perspective at the end of the paper.
 
 
 \item Another point is that you mention
@@ -85,7 +88,7 @@ machines for example. In this paper experiments, only 16 and 32 nodes
 where considered.
 
 \textbf{Answer:}
-We agree with the reviewer that the algorithm is centralized and might be a bottleneck if it was applied to an application running on many thousands of nodes. However, up to 144 nodes in a heterogeneous cluster, the overhead of the algorithm was very small, 0.15 ms, as presented in the simulation results of [6]. We did not execute experiments with more than 32 nodes on Grid'5000 because it does not have many nodes that allow DVFS operations and have energy measurement tools. 
+We agree with the reviewer that the algorithm is centralized and might be a bottleneck if it was applied to an application running on many thousands of nodes. However, up to 144 nodes in a heterogeneous cluster, the overhead of the algorithm was very small, 0.15 ms, as presented in the simulation results of \cite{5}. We did not execute experiments with more than 32 nodes on Grid'5000 because it does not have many nodes that allow DVFS operations and have energy measurement tools. 
 
 On the other hand, the scalability of the proposed algorithm can be improved if we use asynchronous computations or if the algorithm was distributed in a hierarchical manner where a leader is chosen for each cluster or a group of nodes  to compute their scaled frequencies. Improving the scalability of the algorithm is beyond the scope of this paper.
 
@@ -97,7 +100,7 @@ instance a non-stacked bar plot with four colors (one site/16, one
 site/32, two sites/16, two sites/32). I believe it would be much
 easier to compare and avoid the problem of lines.
 
- \textbf{Answer:} We agree with the reviewer. The curves in Figures 6 and 8 in the paper were replaced by histograms.
+ \textbf{Answer:} We agree with the reviewer. The curves in Figures 6 and 8 in the paper have been replaced by histograms.
  
 
 
@@ -112,16 +115,17 @@ instance). You say that on scale this would produce less energy
 savings, but your arguments for providing a solution for this was
 based that today's supercomputers are achieving massive scale.
 
-\textbf{Answer:} In the Figure 7, the energy consumption of the benchmarks solving the class D and running on many scenarios are presented. The number of used nodes varies between 16 and 32 in the scenarios while the size of the problem is not modified. Therefore, the computations to communications times ratio is lower when 32 nodes are used instead of 16. When this ratio is small, it means there are not enough computations when compared to the communications times and the impact of scaling down the frequency of the CPU on its energy consumption is reduced. To solve this problem, the problem 
+\textbf{Answer:} In Figure 7, the energy consumption of the benchmarks solving the class D and running on many scenarios are presented. The number of used nodes varies between 16 and 32 in the scenarios while the size of the problem is not modified. Therefore, the computations to communications times ratio is lower when 32 nodes are used instead of 16. When this ratio is small, it means there are not enough computations when compared to the communications times and the impact of scaling down the frequency of the CPU on its energy consumption is reduced. To solve this problem, the problem 
 should be solved on a number of nodes adequate to its size. For example, for the NAS benchmarks, the class E should have been solved on 32 nodes to have a good computations to communications times ratio.  
 
 
 \item In Sec 6.3, why did you choose to keep 32 processes for the evaluation
 with multi-core clusters? How did you configure MPI for the results
 
-\textcolor{blue}{Answer:  We keep choosing 32 nodes in both scenarios 
-to compare them while one core per node scenario has distributed communications (one network link for each node) and multi-core scenario uses shared network link communications and thus comparing their impact on the results. 
-We configure MPI on one core per node scenario by choosing one core per  nodes (e.g in machine file we did: node1, node2 ,node3, node4). While in multi-core scenario we choose one machine with four cores (e.g. node1 slots=4).}
+\textbf{Answer:} In section 6.3, we wanted to evaluate how much energy can be saved when applying the proposed algorithm to message passing applications with iterations running over a grid composed of multi-core nodes. Therefore, the same experiments as in section 6.2 were conducted on the new  multi-core platform. Instead of running one process per node as in the previous section, 3 or 4 processes were executed on each multi-core node. The total number of processes, 32 processes, was not modified in order to fairly compare the single core and the multi-core versions. 
+
+Only the architecture file was modified between the single and the multi-core architectures. For the single core architecture, the architecture file contains the name of 32 different nodes. For the multi-core architecture, the architecture file contains less nodes and for every node 3 or 4 slots (cores) are used. The total number of slots is equal to 32.
+
  
 
 \item shown in Fig 8a? Some MPI implementations have an option to use shared
@@ -130,8 +134,8 @@ the explanation of the network card utilization, but this
 shared-memory optimization is possible (sometimes automatically
 detected by MPI if you pin processes to cores).
 
-\textcolor{blue}{Answer: We didn't  manually pin processes to cores and since the communication times  
-increased. We guess that the shared memory wasn't used.}
+\textbf{Answer:} We did not  manually pin processes to cores. Since the communication times  
+have increased, we think that the shared memory was not used when two processes, running on the same node, exchange data.
 
 \item In P33, Sec 6.5, you mention that the proposed algorithm outperforms
 EDP because the former considers both metrics (time, energy) and the
@@ -139,8 +143,7 @@ same time. EDP does also, but using a single metric which you have
 defined: energy x execution time. I think this is only a matter of
 phrasing.
 
-\textcolor{blue}{Answer: we use the delay in execution time not the execution time. Then, the equation that we used is EDP= energy x (Tnew-Told). The experiments shows that our objective function 
-is better than the EDP objective.}
+ \textbf{Answer:}  We agree with the reviewer, EDP also uses two metrics in the objective function: energy and delay. The sentence in the paper was modified to clarify this misunderstanding. The main difference between our algorithm and the EDP method is the used objective function. For EDP, the product of energy and delay must be minimized, while for our algorithm, the difference between the normalized performance and the normalized energy should be maximized. This new formulation of the objective function allows our algorithm to select the set of frequencies that gives the best tradeoff between the energy consumption and the performance. The objective function of EDP does not give the same frequencies as our algorithm and thus it is outperformed by our method. The results of the experiments confirm that the objective function used by our algorithm  is more efficient than the one used by EDP.
 
 
 \item Other complementary points to consider:
@@ -159,7 +162,7 @@ is better than the EDP objective.}
 
 + Same for Fig 7.
 
-\item \textcolor{blue}{ Answer: We have considered these points in the paper.}
+  \textbf{Answer:}  We have taken in consideration all these remarks and the paper has been modified accordingly.
 
 \item From the design of experiments, did you consider using replications?
 There is no variability metric in your results. Have you run multiple
@@ -167,150 +170,160 @@ times and got the average (execution time and energy consumption)? I
 feel that such variability needs to be accounted for, otherwise it is
 very hard to affirm anything about measurements.
 
- \textcolor{blue}{Answer: Each experiment has been executed many times and the results presented in the 
- figures are the average values of many executions.}
+ \textbf{Answer:}  Each experiment has been executed many times and the results presented in the 
+ figures are the average values of many executions. Since we have deployed the same operating system on the booked machines and we were the only users executing processes on them during the experiments, no significant variability in the execution time of the applications was noticed. 
 
 
 \item In summary, I think this is a very interesting work but the experimental evaluation lacks variability measurements, consider larger experiments (1K nodes for instance) to see how everything scales,  and there is no overhead measurements although authors stress that in abstract/introduction.
 
-\textcolor{blue}{Answer: We will expand the experimental over a large number of nodes in the future work while increasing the  problem size and considering the variability issues. We have discussed the algorithm overhead and its complexity in section 6.5.}
-\end{enumerate}
+\textbf{Answer:} For the time being, we do not have the resources  nor the time to evaluate the proposed algorithm over large platforms composed of more than 1K nodes. However, as said in the perspectives of the paper, the evaluation of the scalability of the algorithm will be conducted in a future work as soon as we have access to larger resources. We have discussed the overhead of the algorithm and its complexity in section 6.5 and given in the answer to question 2 some solutions to improve its scalability and reduce its overhead. 
 
+For the variability issue, please refer to the answer to question 1. 
 
-\section{Questions of the second reviewer} 
-This paper presents detailed performance and energy model for iterative message passing applications. Further a method is proposed to select the frequencies of heterogeneous cpus online. The selection method itself is not difficult. But I like the systematic modeling for energy consumption and performance. This paper is well written in general. The technical contents are presented in a logical way overall. The experiments are conducted in real platform, which shows the practicality of this work and also makes the work have more impact on the field. However, I have the following comments and concerns for this paper. The authors should clarify them in the revised version. 
+  
+\end{enumerate}
 
 
--move the contributions from related work to introduction
+\section{Questions and remarks of the second reviewer} 
 
 \begin{enumerate}
+\item Move the contributions from related work to introduction.
 
+\textbf{Answer:} The contributions have been moved to the introduction section.
 
-\item why emphasize it is a grid platform? the presentation of related work follows the logic of heterogeneous CPUs. Grid is only a type of platform with heterogeneous CPUs
+\item Why emphasize it is a grid platform? the presentation of related work follows the logic of heterogeneous CPUs. Grid is only a type of platform with heterogeneous CPUs.
 
-\textcolor{blue}{Answer: The proposed algorithm was adapted to the grid platform which is composed 
-of homogeneous clusters and interconnected by a wide area network which is slower than the local 
-network in each cluster. The algorithm can also work on other heterogeneous platforms.} 
+\textbf{Answer:} We agree with the reviewer that a grid is a type of heterogeneous architecture and the proposed algorithm can also work on any heterogeneous architecture. 
 
+  In \cite{5}, we have proposed a frequency selection algorithm for distributed applications running on heterogeneous clusters, while in this work,  the proposed algorithm was adapted to the grid architecture which is composed 
+of homogeneous clusters interconnected by a wide area network which is slower than the local 
+network in each cluster. 
 
 \item Define what iterative message passing applications are and give exemplar applications of them targeted by this method. 
 
-\textcolor{blue}{Answer: The message passing applications with iterations compute
-the same block of operations several times, starting from the initial solution until reaching
-the acceptable approximation of the exact solution (we have added this sentence to the paper page 21). 
-There are many example for these applications 
-such as JACOBI, GAUSS-SEIDE, Successive over-relaxation and  conjugate gradient (CG) method and etc.
-Similarly, an offline method uses DVFS and applied to these applications is in \cite{1} } 
+\textbf{Answer:} In order to clarify things, we have replaced in the paper the sentence ``the iterative message passing applications'' with ``the message passing applications with iterations''. Therefore, the proposed algorithm can be applied to any application that executes the same block of instructions many times and it is not limited to iterative methods that repeat the same block of instructions until convergence. 
 
+Many problems are solved by methods with iterations such as  solving a linear system of equations with Jacobi and Gauss-Seidel methods, Image processing with methods that apply the same instructions for each pixel or block of pixels, etc. 
 
-\item Figure 1 is not clearly explained. Where is the slack time in figure 1 and why slack time =0 for task 1?
-
-\textcolor{blue}{Answer: We agree with the reviewer, this figure was re-plotted to show the slack time. 
- In the figure, we assumed that task 1 is the slower task. So, there are no slack time (waiting time)
- in the slower task because it is not wait for the others while other tasks wait for it.}
 
-\item define the parameters in eq. 1.
+\item Figure 1 is not clearly explained. Where is the slack time in figure 1 and why slack time =0 for task 1?
 
-\textcolor{blue}{Answer: We have defined Fmax and Fnew in the text.}
 
-\item eq. 2: are you assuming each cluster has the same number of nodes?
+\textbf{Answer:} Figure 1 was redrawn, the white   space before the barrier is the slack time. Slack times occur when a node has to wait for another node to finish its computation to synchronously communicate with it.  In Figure 1, task 1 was assumed to be the slowest task. All the other tasks will finish their computations before the slowest task and wait until it finishes its computation before being able to synchronously communicate with it. This waiting time is the slack time and since the slowest task does not have to wait for the other tasks, there is almost no slack time.
 
+\item Define the parameters in eq. 1.
 
+\textbf{Answer:} Fmax and Fnew have been defined as follows in the paper: ``$\Fmax$ is the maximum frequency before applying any DVFS and $\Fnew$  is the new frequency after applying DVFS''. 
 
+\item Eq. 2: are you assuming each cluster has the same number of nodes?
 
-\textcolor{blue}{Answer: No, we assume each cluster has different number of node, so in the equation we
-have replaced $M_i$ instead of $M$ and the same for $F$ replaced with $F_j$ in the all equations of the paper.}
+\textbf{Answer:}  No, each cluster can have a different number of nodes. Therefore, in the paper, $M$, the number of nodes in a cluster, was replaced by  $M_i$, the number of nodes in cluster $i$, in all the equations.  
 
 \item Eq.2 implicitly assumes that there is no overlapping between computation and communication. Is it reasonable?
 
-\textcolor{blue}{Answer: The communications between the computing nodes are synchronized, where each node 
-need to wait for the others to finished their jobs before computing the next iteration. So, there is no
-overlapping between computations and communications for a node. The overlapping happens when the communications are asynchronous or the computations are not depend on the data sent by the neighbouring nodes. }
+\textbf{Answer:} In this paper, only   message passing applications with synchronous and blocking communications were considered. In such applications, there is no overlapping between computations and communications on a node. 
 
-\item eq. 2 is not clear: 
+Asynchronous applications are beyond the scope of this paper and will be considered in a future work. 
 
--how to define and determine the slowest cluster h? the one before scaling or after scaling? 
+\item Eq. 2 is not clear: 
+\begin{enumerate}
+\item How to define and determine the slowest cluster h? the one before scaling or after scaling? 
 
-\textcolor{blue}{Answer: The slower task is the task which gives maximum execution time before scaling the frequency of the node. We have added this sentence to the paper (page 8).}
+\textbf{Answer:}  The slowest node $h$ is the node which takes the  maximum execution time to execute an iteration  before scaling down its  frequency. The previous sentence has been added to the paper.
  
 
-- what is the communication time without slack time
+\item What is the communication time without slack time?
+
+\textbf{Answer:} There is no synchronous communication with zero slack times, but if a node sends a message to another node that is already waiting for that message, the latter will acknowledge the reception of the message from the sender without any delay. On the other hand, if the receiving  node is still computing the sender has to wait for it to finish its computation to acknowledge the reception of the message. This time is called the slack time. 
+
 
-\textcolor{blue}{Answer: There is no synchronous communications with zero slack times, but if a node send a message to another node which is already waiting for that message. The latter will acknowledge the reception of the message from the sender without any delay. On the other hand, if the receiving  node is still computing the sender has to wait for it to finish its computation to acknowledge the reception of the message. This time is called the slack time. }
+\item In equation, min operation is used to get the communication time, but in text, it says to use the slowest communication time, which should use the max operation then.
 
+\textbf{Answer:} We agree with the reviewer and the sentence  "the slowest communication time" has been changed to "the communication time of the slowest node" in the paper.
+
+\end{enumerate}
 
-- in equation, min operation is used to get the communication time, but in text, it says to use the slowest communication time, which should use the max operation then.
 
-\textcolor{blue}{Answer: We agree with the reviewer and the sentence  "slower communication time" changed to "communication time of the slower node" in the paper.}
+\item Discuss the difference between eq. 2 and the prediction model in references \cite{4} and \cite{5}.
 
-\item discuss the difference between eq. 2 and the prediction model in references [5] and [6]
+\textbf{Answer:}  The prediction models  in \cite{4} and \cite{5} are for homogeneous and heterogeneous clusters respectively, while the model in Equation 2 is adapted for  grids. We have adapted the prediction models to the used architecture. Each architecture has its own characteristics. For example, in a homogeneous cluster all the nodes have the same specifications and only one scaling factor is computed by the algorithm for all the nodes of the cluster. 
+On the other hand,  in a  heterogeneous cluster, the nodes may have different specifications and a scaling factor should be computed for each node. The prediction models of a heterogeneous cluster can be used for a homogeneous cluster. In the same way, the models in this paper take more characteristics into consideration such as different networks to be adapted for grids and they can also be applied to a heterogeneous cluster.  Therefore, the  models presented in this paper are more complete than those presented in  \cite{4} and \cite{5} and take more characteristics into consideration. 
 
-\textcolor{blue}{Answer: The prediction models  in [5] and [6] are for homogeneous and heterogeneous clusters respectively, while eq. 2 is for a grid. where the homogeneous cluster predication model was used one scaling factor denoted as $S$, because all the nodes in the cluster have the same computing powers. Whereas, in heterogeneous cluster prediction model all the nodes have different scales and the scaling factors have denoted as one dimensional vector $(S_1, S_2, \dots, S_N)$. The execution time prediction model for a grid  Equation (2) defines a two dimensional array of scales  
-$(S_{11}, S_{12},\dots, S_{NM_i})$. We have added this to the paper (page 8).}
 
 \item Eq. 10: Can the authors comment on the energy consumed by communications?
 
-\textcolor{blue}{Answer: The CPU during  communications consumed only the static power power. While
-in computations the CPU consumes both the dynamic and static communication, refer to \cite{3}. We have added this sentience to the paper, page 11.}
+\textbf{Answer:} During communications, the CPU only consumes the static power  and during computations it consumes both  dynamic and static power. For more information the reviewer can refer to \cite{3}. 
 
 \item This work assume homogeneous cpu in one cluster. Line 55 says: even if the distributed message
 passing iterative application is load balanced, the computation time of each cpu j in cluster i may be different  Why?
 
-\textcolor{blue}{Answer: The computation times may be slightly different due to the delay caused
-by the scheduler of the operating system. We have added this in the paper.}
+\textbf{Answer:} In a homogeneous cluster executing a load balanced distributed  application,  the computation time of each node might be slightly different than the others due to some delay caused
+by the scheduler of the operating system of the node.
 
 \item Comment why the applications in NAS parallel benchmark are iterative application? These applications are normally run in one cluster. Describe in more detail how they are run across multiple clusters. 
 
-\textcolor{blue}{Answer: The applications in NAS parallel benchmark are  application with iterations  because they iterate the same block of instructions (communications and computations) many times. All the benchmarks are MPI programs that allowed to be executed on any distributed memory platform such as clusters and grids with no required modifications. Since, we have deployed the same operating system on all the nodes, we just compile the source on one cluster and then copied the executable program on all the clusters. }
+\textbf{Answer:} The sentence ``iterative applications'' was replaced by ``applications with iterations'' because the proposed algorithm can be applied to any application that executes the same block of instructions many times and it is not limited to iterative methods that terminate when they converge.  The NAS parallel benchmarks are  applications with iterations  because they iterate the same block of instructions until convergence or for a fixed number of iterations. These benchmarks can be executed on any distributed memory platform such as clusters or grids with no required modifications. Since we have deployed the same operating system on all the nodes, we just compile the source on one node and then copy the executable program on all the other nodes. The application can then be executed with an ``mpirun'' command that takes three arguments:
+\begin{itemize}
+\item the name of the application to execute
+\item the number of processes required to execute the application 
+\item the architecture file that contains the names of the nodes that will execute the application. They could be from different clusters.
 
-\item broken sentence in line 28 on page 12
+\end{itemize}
+\item Broken sentence in line 28 on page 12.
 
-\textcolor{blue}{Answer: The word "were" replaced with "where".}
+\textbf{Answer:} The sentence has been corrected.
 
 \item Why $T_{old}$ is computed using eq. 12, which applies MAX over computation time and communication time, while in  $T_{new}$, max and min operations are applied over computation and communication separately?
 
-\textcolor{blue}{Answer:  We  agree with the reviewer, $T_{old}$ is the maximum execution time of the application before scaling the frequency and it is computed as in $T_{new}$ equation without scaling factors. So, we have changed the $T_{old}$ in the paper as as follows:
+\textbf{Answer:} Both forms can be used for computing $T_{old}$ and $T_{new}$. To avoid this confusion, the same form was used for both equations in the paper.
+
 \begin{equation}
   \label{eq:told}
    T_{old} = \mathop{\max_{i=1,2,\dots,N}}_{j=1,2,\dots,M_i} (\Tcp[ij]) + 
-   \mathop{\min_{i=1,2,\dots,N}} (\Tcm[hj] )           
+   \mathop{\min_{j=1,2,\dots,M_h}} (\Tcm[hj] )           
 \end{equation}
-}
+where $h$ is the index of the slowest cluster. 
+
+   
 
 \item Line 55 on page 16 is to define the slack time, which should be introduced at the beginning of the paper, such as in figure 1.
 
-\textcolor{blue}{Answer: We have changed it in the paper and added to page 6.}
+\textbf{Answer:} We agree with the reviewer and the slack time is now presented at the beginning of the paper.
 
 
 \item Authors comment whether (and how) the proposed methods can be applied/extended to other programming models and/or platform, such as mapreduce, heterogeneous cluster with CPU+GPU.
-Revision 
 
-\textcolor{blue}{Answer: The proposed method can only be applied to parallel programming with iteration  
-and with or without message passing. Indeed, the proposed method can be applied to the parallel application  with mapreduce if it is a regular application with iterations. Therefore,  the time of each map and reduce operations (communications) and the computation times in the program must be computed at the first iterations to predict the energy consumption and the execution time. After, the proposed algorithm can be used as it to select the best frequencies. 
-The proposed method can be applied to a heterogeneous platform composed from GPUs and CPUs, since modern GPUs like CPUs allow the use of DVFS operation.}
-\end{enumerate}
+\textbf{Answer:}  The proposed method can only be applied to parallel models with iterations  
+and with or without message passing. If only a few map and reduce operations are executed in the application and these operations are not iterative, the proposed algorithm cannot be adapted to that type of applications. On the other hand, if the  map or reduce  operations are iterative, the proposed algorithm can be applied  when executing these operations. Finally if, in the application, the same map and reduce operations are executed many times iteratively, the proposed algorithm can then be applied to the whole application while considering that an iteration consists of a map operation followed by a reduce operation.  
 
-\section{Questions of the third reviewer}
-In this paper, a new online frequency selecting algorithm for grids, composed of heterogeneous clusters, is presented. It selects the frequencies and tries to give the best trade-off between
-energy saving and performance degradation, for each node computing the message passing iterative application. The algorithm has a small overhead and works without training or profiling. It uses a new energy model for message
-passing iterative applications running on a grid. The proposed algorithm is evaluated on a real grid, the Grid'5000 platform, while running the NAS parallel benchmarks. The experiments on 16 nodes, distributed on three clusters, show
-that it reduces on average the energy consumption by 30\% while the performance is on average only degraded by 3.2\%. Finally, the algorithm is compared to an existing method. The comparison results show that it outperforms the
-latter in terms of energy consumption reduction and performance.
+The proposed method with some adaptations can be applied to applications with iterations running on heterogeneous platforms composed of GPUs and CPUs because modern GPUs like CPUs allow the use of DVFS.
+\end{enumerate}
 
-this paper is quite interesting and solid. But before acceptance, I suggest to have the following major revisions:
+\section{Questions and remarks of the third reviewer}
 \begin{enumerate}
 
-\item suggest the authors to use much larger size of nodes, instead of on 16 nodes, distributed on three clusters, to see the scalability of the energy saving
+\item Suggest the authors to use much larger size of nodes, instead of on 16 nodes, distributed on three clusters, to see the scalability of the energy saving
+
+\textbf{Answer:} The experiments were not only conducted over 16  nodes, but they were also executed  over 32 nodes distributed over three clusters. 
+In \cite{5} the algorithm was evaluated  on a simulated heterogeneous cluster composed of up to 144 nodes. The overhead of the algorithm was very small, just 0.15 ms.  
+
+ The experiments were not conducted on more than 32 nodes of Grid'5000 because it does not have many nodes that allow DVFS operations and have energy measurement tools. We agree with the reviewer that  experiments using much larger number of nodes should be conducted to evaluate the scalability of the proposed algorithm and when we  have access to such platforms,  we will evaluate the proposed method over a larger number of nodes.
+
+\item  The energy saving is actually calculated by the quantitative formula instead of the real measurements.  Can you have any  discussions on the real measurements?
+
+\textbf{Answer:}  This paper does not focus on measuring the energy consumption of CPUs in a grid. It presents models to predict the energy consumption and the performance of an application with iterations running on a grid. These models use the given  dynamic and static powers to predict the energy consumption of each CPU with different scaling factors. Moreover, since we do not have physical access to the nodes of the grid which are geographically distributed on many sites in France, we cannot use hardware tools to measure  the consumption of CPUs. Therefore, we used  Grid'5000's  tool which measures the overall power consumption of a node in real-time. These values were used to deduce the dynamic power of the node when computing with the maximum frequency. 
+ 
+ As a future work, it would be  interesting  to compare the accuracy of the results of the proposed energy model to the values given by instruments  that measure the energy consumptions of CPUs during the execution time, as in \cite{2}.
+
+\item The overhead is not measured, can you present something on this as well to demonstrate what the authors claimed "has a small overhead and works without training or profiling"?
 
-\textcolor{blue}{Answer: We have made the experiments not only on 16  nodes, but we have also made them  over 32 nodes distributed over three clusters and in the near future we will apply the proposed method over a larger number of nodes.}
+\textbf{Answer:} In the comparison section 6.5, we have presented the execution time of the algorithm when it is executed over 32 nodes from three clusters and  located in two different sites.  It takes on average 0.01 $ms$. In \cite{5} the algorithm was evaluated  on a simulated heterogeneous cluster composed of up to 144 nodes. The overhead of the algorithm was  just 0.15 ms.  
 
-\item  the energy saving is actually calculated by the quantitative formula instead of the real measurements.  Can you have any  discussions on the real measurements?
 
-\textcolor{blue}{Answer: The scope of this paper is not mainly focuses on the energy measurements, but it focuses on modelling and optimizing the energy and performance of grid systems. The proposed energy model depends on the dynamic and static power values for each CPU. We have used a real power measurement tools allowed in Grid'5000 sites to measure the dynamic power consumption. Moreover, the real measurements are difficult  for a grid platform when the nodes are geographically distributed. As a future work, it is interesting  to compare the accuracy of the proposed energy model with a real instruments  to measure the energy consumption for local clusters such as the measurement tools presented in \cite{2}.}
+The sentence : ``the algorithm works online without profiling'' means that it only uses the measured communication and computation times during the run-time and does not require to profile the application before run-time. Some methods use profilers before executing the application to gather a lot of information about the application such as computations to communication ratios and dependencies between tasks. The gathered information is used to scale the frequency of each node before executing the application.  
 
-\item the overhead is not measured, can you present something on this as well to demonstrate what the authors claimed "has a small overhead and works without training or profiling"?
+The algorithm works without training because it does not require the partial or the total execution of the application before run-time. Indeed, some applications run parts of the application while using various frequencies to measure their energy consumption  in advance. Then, using these values, they select the frequency of each node before executing the application.  
 
-\textcolor{blue}{Answer: In the comparison section 6.5, we have presented the execution time of the algorithm when it is executed over 32 nodes distributed over three sites located at two different sites, it takes on average 0.01 $ms$. The algorithm works online without training which means it only uses the measured communication and computation times during the runtime and do not require any profiling or training executed before runtime.}
 \end{enumerate}
 \bibliographystyle{plain}
 \bibliography{ref.bib}
