X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/7c598f9d3894ffc00d894cfcbd7684d51fb7c14a..e2d0acd1461bf4e64de95e87f02267cc513c1094:/Heter_paper.tex?ds=sidebyside

diff --git a/Heter_paper.tex b/Heter_paper.tex
index 6be3c9f..8b0f807 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -785,13 +785,13 @@ nodes were connected via an Ethernet network with 1 Gbit/s bandwidth.
 
 
 The proposed algorithm was applied to the seven parallel NAS benchmarks (EP, CG,
-MG, FT, BT, LU and SP) and  the benchmarks were executed with the three classes:
+MG, FT, BT, LU and SP) and the benchmarks were executed with the three classes:
 A, B and C. However, due to the lack of space in this paper, only the results of
-the  biggest class,  C, are  presented while  being run  on different  number of
-nodes,  ranging from 4  to 128  or 144  nodes depending  on the  benchmark being
-executed. Indeed, the benchmarks CG, MG, LU, EP and FT had to be executed on $1,
-2, 4, 8, 16, 32, 64, 128$ nodes.   The other benchmarks such as BT and SP had to
-be executed on $1, 4, 9, 16, 36, 64, 144$ nodes.
+the biggest class, C, are presented while being run on different number of
+nodes, ranging from 4 to 128 or 144 nodes depending on the benchmark being
+executed. Indeed, the benchmarks CG, MG, LU, EP and FT had to be executed on 1,
+2, 4, 8, 16, 32, 64, or 128 nodes.  The other benchmarks such as BT and SP had
+to be executed on 1, 4, 9, 16, 36, 64, or 144 nodes.
 
  
  
