X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/7cbdba88cb895d373a2bb5a27084fc687d7f7476..93836a322514b561c0e5f2c9a2fcdf584617852e:/Heter_paper.tex?ds=sidebyside

diff --git a/Heter_paper.tex b/Heter_paper.tex
index 4c6df55..5d28377 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -283,7 +283,7 @@ vector of scaling factors can be predicted using (\ref{eq:perf}).
  \textit  T_\textit{new} = 
  \max_{i=1,2,\dots,N} ({TcpOld_{i}} \cdot S_{i}) +  MinTcm 
 \end{equation}
-Where:\\
+Where:
 \begin{equation}
 \label{eq:perf2}
  MinTcm = \min_{i=1,2,\dots,N} (Tcm_i)
