X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/84ab24afb3833db2fe7a7d9c4c6996b923b8e33c..d76c3b96fde2dfb310f6f5bb4d244c9d255984fd:/Heter_paper.tex?ds=inline

diff --git a/Heter_paper.tex b/Heter_paper.tex
index ab0be1f..530730c 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -632,7 +632,7 @@ which results in bigger energy savings.
     \EndWhile
     \State  Return $Sopt_1,Sopt_2,\dots,Sopt_N$
   \end{algorithmic}
-  \caption{Heterogeneous scaling algorithm}
+  \caption{frequency scaling factors selection algorithm}
   \label{HSA}
 \end{algorithm}
 
