X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/93836a322514b561c0e5f2c9a2fcdf584617852e..706e9b5431b0c6d9cb8b184ac36e3956bfb3abcc:/Heter_paper.tex

diff --git a/Heter_paper.tex b/Heter_paper.tex
index 5d28377..1d92130 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -725,16 +725,16 @@ nodes were connected via an Ethernet network with 1 Gbit/s bandwidth.
     type          &GFLOPS     & Freq.    & Freq.        & Freq.          & power        & power \\
                   &           & GHz      & GHz          &GHz             &              &       \\
     \hline
-    1             &40         & 2.5      & 1.2          & 0.1            & 20~w         &4~w    \\
+    1             &40         & 2.5      & 1.2          & 0.1            & 20~W         &4~W    \\
          
     \hline
-    2             &50         & 2.66     & 1.6          & 0.133          & 25~w         &5~w    \\
+    2             &50         & 2.66     & 1.6          & 0.133          & 25~W         &5~W    \\
                   
     \hline
-    3             &60         & 2.9      & 1.2          & 0.1            & 30~w         &6~w    \\
+    3             &60         & 2.9      & 1.2          & 0.1            & 30~W         &6~W    \\
                   
     \hline
-    4             &70         & 3.4      & 1.6          & 0.133          & 35~w         &7~w    \\
+    4             &70         & 3.4      & 1.6          & 0.133          & 35~W         &7~W    \\
                   
     \hline
   \end{tabular}
