X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/aa9663658d3c3d1380ea67643e66b005b37b48d7..1cea7b40511f60228c23a644b707615cd1559471:/Heter_paper.tex?ds=inline

diff --git a/Heter_paper.tex b/Heter_paper.tex
index be509e7..a604b96 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -88,9 +88,10 @@ platforms many techniques have been  used. Dynamic voltage and frequency scaling
 consumption.  However,  lowering the  frequency  of  a  CPU might  increase  the
 execution  time of  an application  running on  that processor.   Therefore, the
 frequency that  gives the best trade-off  between the energy  consumption and the
-performance of an application must be selected.\\
-In this  paper, a new  online frequencies selecting algorithm  for heterogeneous
-platforms is presented.   It selects the frequency which tries  to give the best
+performance of an application must be selected.
+
+In this  paper, a new  online frequency selecting algorithm  for heterogeneous
+platforms is presented.   It selects the frequencies and tries  to give the best
 trade-off  between  energy saving  and  performance  degradation,  for each  node
 computing the message  passing iterative application. The algorithm  has a small
 overhead and works without training or profiling. It uses a new energy model for
@@ -581,7 +582,7 @@ that node, it is replaced by the nearest available frequency.  In
 Figure~\ref{fig:st_freq}, the nodes are sorted by their computing power in
 ascending order and the frequencies of the faster nodes are scaled down
 according to the computed initial frequency scaling factors.  The resulting new
-frequencies are colored in blue in Figure~\ref{fig:st_freq}.  This set of
+frequencies are highlighted in Figure~\ref{fig:st_freq}.  This set of
 frequencies can be considered as a higher bound for the search space of the
 optimal vector of frequencies because selecting frequency scaling factors higher
 than the higher bound will not improve the performance of the application and it
@@ -748,22 +749,22 @@ nodes were connected via an Ethernet network with 1 Gbit/s bandwidth.
   \caption{Heterogeneous nodes characteristics}
   % title of Table
   \centering
-  \begin{tabular}{|*{7}{l|}}
+  \begin{tabular}{|*{7}{r|}}
     \hline
     Node          &Simulated  & Max      & Min          & Diff.          & Dynamic      & Static \\
     type          &GFLOPS     & Freq.    & Freq.        & Freq.          & power        & power \\
                   &           & GHz      & GHz          &GHz             &              &       \\
     \hline
-    1             &40         & 2.5      & 1.2          & 0.1            & 20~W         &4~W    \\
+    1             &40         & 2.50     & 1.20         & 0.100          & \np[W]{20}   &\np[W]{4} \\
          
     \hline
-    2             &50         & 2.66     & 1.6          & 0.133          & 25~W         &5~W    \\
+    2             &50         & 2.66     & 1.60         & 0.133          & \np[W]{25}   &\np[W]{5} \\
                   
     \hline
-    3             &60         & 2.9      & 1.2          & 0.1            & 30~W         &6~W    \\
+    3             &60         & 2.90     & 1.20         & 0.100          & \np[W]{30}   &\np[W]{6} \\
                   
     \hline
-    4             &70         & 3.4      & 1.6          & 0.133          & 35~W         &7~W    \\
+    4             &70         & 3.40     & 1.60         & 0.133          & \np[W]{35}   &\np[W]{7} \\
                   
     \hline
   \end{tabular}
