X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/c0f811adf4e7fb3bb57c6042f027be6adc4db147..f0291c07d5769b00a780596f81133ae612c87357:/Heter_paper.tex

diff --git a/Heter_paper.tex b/Heter_paper.tex
index 6c37115..3ba3204 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -61,7 +61,6 @@
     RaphaÃ«l Couturier,
     Ahmed Fanfakh and
     Arnaud Giersch
-the normalized performance equation, as follows:
   } 
   \IEEEauthorblockA{%
     FEMTO-ST Institute\\
