X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy2.git/blobdiff_plain/d509f4d19eb0a9dfb0cb8fcc367e63e0e172fd42..1cea7b40511f60228c23a644b707615cd1559471:/Heter_paper.tex?ds=sidebyside

diff --git a/Heter_paper.tex b/Heter_paper.tex
index af3d660..a604b96 100644
--- a/Heter_paper.tex
+++ b/Heter_paper.tex
@@ -582,7 +582,7 @@ that node, it is replaced by the nearest available frequency.  In
 Figure~\ref{fig:st_freq}, the nodes are sorted by their computing power in
 ascending order and the frequencies of the faster nodes are scaled down
 according to the computed initial frequency scaling factors.  The resulting new
-frequencies are colored in blue in Figure~\ref{fig:st_freq}.  This set of
+frequencies are highlighted in Figure~\ref{fig:st_freq}.  This set of
 frequencies can be considered as a higher bound for the search space of the
 optimal vector of frequencies because selecting frequency scaling factors higher
 than the higher bound will not improve the performance of the application and it
