X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/presentation_reservoir.git/blobdiff_plain/f57ef2ff814ac1dd73f49a26f6aab3abc6ef0523..4196be5e022044fd7b16f0dd92a7337472a24c1f:/reservoir.tex?ds=inline

diff --git a/reservoir.tex b/reservoir.tex
index 05bcb21..950da0f 100644
--- a/reservoir.tex
+++ b/reservoir.tex
@@ -319,6 +319,9 @@ Application on the MNIST problem}
 
 \begin{frame}{Performances of the parallel code} % Slide 12
   % To be completed
+  10000 images:\\
+  1000 reservoirs of 2 neurons, error : 3.85\%\\
+  1 reservoir of 2000 neurons, error : 7.14\%
   \includegraphics[width=7.5cm]{speedup.pdf}
 \end{frame}
 
