X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/presentation_reservoir.git/blobdiff_plain/f95a695c27ea2ecd2e2f918fb084642227063290..f57ef2ff814ac1dd73f49a26f6aab3abc6ef0523:/reservoir.tex?ds=inline

diff --git a/reservoir.tex b/reservoir.tex
index 82dbdf3..05bcb21 100644
--- a/reservoir.tex
+++ b/reservoir.tex
@@ -319,6 +319,7 @@ Application on the MNIST problem}
 
 \begin{frame}{Performances of the parallel code} % Slide 12
   % To be completed
+  \includegraphics[width=7.5cm]{speedup.pdf}
 \end{frame}
 
 \begin{frame}{Exploring ways to improve the results} % Slide 13
