X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/prng_gpu.git/blobdiff_plain/1ad3649fd6e60ffa7c238cf99b577c7cce7d7b26..9fb4290afcf7de31edb7dda484ba7a2fedadaafb:/prng_gpu.tex?ds=inline

diff --git a/prng_gpu.tex b/prng_gpu.tex
index f357476..bc06797 100644
--- a/prng_gpu.tex
+++ b/prng_gpu.tex
@@ -180,8 +180,8 @@ Pseudorandom numbers are generated at a rate of 20GSamples/s, which is faster
 than in~\cite{conf/fpga/ThomasHL09,Marsaglia2003} (and with a better
 statistical behavior). Experiments are also provided using BBS as the initial
 random generator. The generation speed is significantly weaker.
-Note also that an original qualitative comparison between topological chaotic
-properties and statistical test is also proposed.
+%Note also that an original qualitative comparison between topological chaotic
+%properties and statistical test is also proposed.
 
 
 
