X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/prng_gpu.git/blobdiff_plain/9e057cd5768916849c2767ef4bd0f54dd9adc3b4..26a94eb935af7804c64342d5c4718e05c9e10036:/reponse.tex?ds=sidebyside

diff --git a/reponse.tex b/reponse.tex
index 0ffb36a..865604e 100644
--- a/reponse.tex
+++ b/reponse.tex
@@ -18,7 +18,9 @@
 \bigskip
 \textit{The authors should include a summary of  test measurements showing their method passes the test sets mentioned (NIST, Diehard, TestU01) instead of the one sentence saying it passed that is in section 1.}
 
-\begin{color}{red} Raph, c'est pour toi Ã§a.\end{color}
+\begin{color}{red} In section 1, we have added a small summary of test measurements performed with BigCrush of TestU01.
+As other tests (NIST, Diehard, SmallCrush and Crush of TestU01 ) are deemed less selective, in this paper we did not use them.
+\end{color}
 
 
 \bigskip
