X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/prng_gpu.git/blobdiff_plain/d010317c87f30b6e833bb9880b710a013b0e8509..5868f4ee274d7fc021616da109c53b54c99529a0:/prng_gpu.tex

diff --git a/prng_gpu.tex b/prng_gpu.tex
index efcc4d5..e5b80cc 100644
--- a/prng_gpu.tex
+++ b/prng_gpu.tex
@@ -987,10 +987,10 @@ should be of better quality.
 
 \begin{figure}[htbp]
 \begin{center}
-  \includegraphics[scale=.7]{curve_time_gpu.pdf}
+  \includegraphics[scale=.7]{curve_time_xorlike_gpu.pdf}
 \end{center}
-\caption{Number of random numbers generated per second}
-\label{fig:time_gpu}
+\caption{Number of random numbers generated per second with the xorlike based prng}
+\label{fig:time_xorlike_gpu}
 \end{figure}
 
 
@@ -1000,6 +1000,15 @@ In  comparison,   Listing~\ref{algo:seqCIprng}  allows  us   to  generate  about
 
 
 
+\begin{figure}[htbp]
+\begin{center}
+  \includegraphics[scale=.7]{curve_time_bbs_gpu.pdf}
+\end{center}
+\caption{Number of random numbers generated per second with the bbs based prng}
+\label{fig:time_bbs_gpu}
+\end{figure}
+
+
 
 %% \section{Cryptanalysis of the Proposed PRNG}
 
