X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rairo15.git/blobdiff_plain/17bd6f6df9a94a46128919486c226ae8b1124740..8845f0ad0e1fda56b399e8c451712a1cd6b3afe4:/main.tex?ds=sidebyside

diff --git a/main.tex b/main.tex
index efbc870..bc8bb20 100644
--- a/main.tex
+++ b/main.tex
@@ -126,28 +126,28 @@ may be  updated at each iteration.   At the theoretical level,  we show that
 
 
 
-\section{Stopping Time}
+\section{Random walk on the modified Hypercube}
 \input{stopping}
 
 % Donner la borne du stopping time quand on marche dedans (nouveau). 
 % Énoncer le problème de la taille de cette borne (elle est certes finie, mais grande). 
 
-
+\section{Proofs of Chaos in this context}
 
 
 \section{Quality study of the strategy}
 %6) Se pose alors la question de comment générer une stratégie de "bonne qualité". Par exemple, combien de générateurs aléatoires embarquer ? (nouveau)
 
 
-\section{Expérimentations}
-%
+\section{Application to Pseudorandom Number Generation}
+\input{prng}
 
 \section{Conclusion}
 %\input{conclusion}
 
 %\acknowledgements{...}
 
-
+\bibliographystyle{alpha}
 \bibliography{biblio}
 
 \end{document}
