X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rairo15.git/blobdiff_plain/bc87eea8f89e38db87cb1d4705c6cfbfa993e27c..3820ec6286eab552baad3b3d7c0451e1bbc42482:/main.tex?ds=inline

diff --git a/main.tex b/main.tex
index e10eba4..bc8bb20 100644
--- a/main.tex
+++ b/main.tex
@@ -126,7 +126,7 @@ may be  updated at each iteration.   At the theoretical level,  we show that
 
 
 
-\section{Stopping Time}
+\section{Random walk on the modified Hypercube}
 \input{stopping}
 
 % Donner la borne du stopping time quand on marche dedans (nouveau). 
