X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/10e29ec6c99b9f2d163484f8e73c99adcfb8ed1d..790076ac4faf501e0eb39d825fba2570cbe85f24:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index 9cc8e03..24ab679 100644
--- a/paper.tex
+++ b/paper.tex
@@ -750,7 +750,7 @@ lot. Consequently the execution times in that cases also varies.
 These  findings may  help a  lot end  users to  setup the  best and  the optimal
 targeted environment for the application deployment when focusing on the problem
 size scale up.  It  should be noticed that the same test has  been done with the
-grid 2 $\times$ 16 leading to the same conclusion.
+grid 4 $\times$ 8 leading to the same conclusion.
 
 \subsubsection{CPU Power impacts on performance}
 
