X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/18a590b4593843d38f5012c20a06f000388301cf..bc2198a79238fd0624ab3465e8c2c41b0c84d640:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index b9d11d4..4d0bfe2 100644
--- a/paper.tex
+++ b/paper.tex
@@ -349,14 +349,15 @@ In addition, the following arguments are given to the programs at runtime:
 	\item maximum number of inner iterations $\MIG$ and outer iterations $\MIM$,
 	\item inner precision $\TOLG$ and outer precision $\TOLM$,
 	\item matrix sizes of the 3D Poisson problem: N$_{x}$, N$_{y}$ and N$_{z}$ on axis $x$, $y$ and $z$ respectively,
-	\item matrix diagonal value is fixed to $6.0$ for synchronous Krylov multisplitting experiments and $6.2$ for asynchronous block Jacobi experiments, \RC{CE tu vÃ©rifies, je dis ca de tÃªte}
+	\item matrix diagonal value is fixed to $6.0$ for synchronous Krylov multisplitting experiments and $6.2$ for asynchronous block Jacobi experiments,
 	\item matrix off-diagonal value is fixed to $-1.0$,
 	\item number of vectors in matrix $S$ (i.e. value of $s$),
 	\item maximum number of iterations $\MIC$ and precision $\TOLC$ for CGLS method,
         \item maximum number of iterations and precision for the classical GMRES method,
         \item maximum number of restarts for the Arnorldi process in GMRES method,
-      	\item execution mode: synchronous or asynchronous,
+      	\item execution mode: synchronous or asynchronous.
 \end{itemize}
+\LZK{CE pourrais tu vÃ©rifier et confirmer les valeurs des Ã©lÃ©ments diag et off-diag de la matrice?}
 
 It should also be noticed that both solvers have been executed with the Simgrid selector \texttt{-cfg=smpi/running\_power} which determines the computational power (here 19GFlops) of the simulator host machine.
 
