X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/2110422a08b1d1879e5dd4435e37b6f372327aa1..3637906714daf8280cff7a8ca2fda0a2b0647531:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index b9187dd..7e740ec 100644
--- a/paper.tex
+++ b/paper.tex
@@ -556,6 +556,8 @@ In what follows, we will present the test conditions, the output results and our
 \ \\
 % environment
 
+\RC{Je ne comprends plus rien CE : pourquoi dans 5.4.1 il y a 2 network et aussi dans 5.4.2. Quelle est la diffÃ©rence? Dans la figure 3 de la section 5.4.1 pourquoi il n'y a pas N1 et N2?}
+
 \begin{table} [ht!]
 \begin{center}
 \begin{tabular}{ll }
