X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/790076ac4faf501e0eb39d825fba2570cbe85f24..59da6f755ef66f1836438561750b66573b663c86:/paper.tex

diff --git a/paper.tex b/paper.tex
index 24ab679..9c5f093 100644
--- a/paper.tex
+++ b/paper.tex
@@ -679,7 +679,7 @@ network  latency  from  $8.10^{-6}$  to $6.10^{-5}$  implies  an  absolute  time
 increase of more than $75\%$ (resp.   $82\%$) of the execution for the classical
 GMRES  (resp.   Krylov  multisplitting)  algorithm. The  execution  time  factor
 between the two algorithms  varies from 2.2 to 1.5 times  with a network latency
-decreasing from $8.10^{-6}$ to $6.10^{-5}$.
+decreasing from $8.10^{-6}$ to $6.10^{-5}$ second.
 
 
 \subsubsection{Network bandwidth impacts on performance}
@@ -752,7 +752,8 @@ targeted environment for the application deployment when focusing on the problem
 size scale up.  It  should be noticed that the same test has  been done with the
 grid 4 $\times$ 8 leading to the same conclusion.
 
-\subsubsection{CPU Power impacts on performance}
+\subsubsection{CPU Power impacts on performance\\}
+
 
 \begin{table} [htbp]
 \centering
