X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/7f0014c901a78db6eabc4e705b0fb6f0dd7b681e..354a667741453335193cea49b706c13237c5c8ab:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index cdbc6e7..94c5125 100644
--- a/paper.tex
+++ b/paper.tex
@@ -401,7 +401,7 @@ performance was increased in a factor of 2. The results depict also that
 when the network speed drops down, the difference between the execution 
 times can reach more than 25\%. 
 
-\textit{\\\\\\\\\\\\\\\\\\3.c Network latency impacts on performance}
+\textit{3.c Network latency impacts on performance}
 
 % environment
 \begin{footnotesize}
