X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/96e726f9524ffdb8eaead14a943d80870ea1da65..6c7302bf636a5a1d81f7135b7ef429d9e2ecf2f6:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index c3cfdbb..81afcf5 100644
--- a/paper.tex
+++ b/paper.tex
@@ -494,8 +494,8 @@ designed to  operate with a bandwidth  equals to 10Gbits (resp.  1Gbits/s) and a
 latency of 8.10$^{-6}$ seconds (resp.  5.10$^{-5}$) for the intra-clusters links
 (resp.  inter-clusters backbone links).  \\
 
-\LZK{Il me semble que le bw et lat des deux rÃ©seaux varient dans les expÃ©s d'une simu Ã  l'autre. On vire la derniÃ¨re phrase?}
-\RC{il me semble qu'on peut laisser ca}
+%\LZK{Il me semble que le bw et lat des deux rÃ©seaux varient dans les expÃ©s d'une simu Ã  l'autre. On vire la derniÃ¨re phrase?}
+%\RC{il me semble qu'on peut laisser ca}
 
 \textbf{Step 5}: Conduct an extensive and comprehensive testings
 within these configurations by varying the key parameters, especially
@@ -644,9 +644,9 @@ the  network speed  drops down (variation of 12.5\%), the  difference between  t
 \begin{figure} [htbp]
 \centering
 \includegraphics[width=100mm]{cluster_x_nodes_n1_x_n2.pdf}
-\caption{Various grid configurations with networks N1 vs N2
-\AG{\np{8E-6}, \np{5E-6} au lieu de 8E-6, 5E-6}}
-\RCE{Corrige}
+\caption{Various grid configurations with networks N1 vs N2}
+%\AG{\np{8E-6}, \np{5E-6} au lieu de 8E-6, 5E-6}}
+%\RCE{Corrige}
 \label{fig:02}
 \end{figure}
 %\end{wrapfigure}
@@ -670,18 +670,19 @@ the  network speed  drops down (variation of 12.5\%), the  difference between  t
 \begin{figure} [htbp]
 \centering
 \includegraphics[width=100mm]{network_latency_impact_on_execution_time.pdf}
-\caption{Network latency impacts on execution time
-\AG{\np{E-6}}}
+\caption{Network latency impacts on execution time}
+%\AG{\np{E-6}}}
 \label{fig:03}
 \end{figure}
 
-According to  the results of  Figure~\ref{fig:03}, a degradation of  the network
-latency from  $8.10^{-6}$ to  $6.10^{-5}$ implies an  absolute time  increase of
-more  than $75\%$  (resp.  $82\%$)  of the  execution  for  the classical  GMRES
-(resp.  Krylov multisplitting)  algorithm which means that the GMRES seems tolerate more the network latency variation with a less  rate increase  of  the  execution time. However, the execution time factor between the two algorithms varies from 2.2 to 1.5 times with a network latency decreasing from $8.10^{-6}$ to  $6.10^{-5}$.
+In Table~\ref{tab:03}, parameters  for the influence of the  network latency are
+reported.  According to the results of Figure~\ref{fig:03}, a degradation of the
+network  latency  from  $8.10^{-6}$  to $6.10^{-5}$  implies  an  absolute  time
+increase of more than $75\%$ (resp.   $82\%$) of the execution for the classical
+GMRES  (resp.   Krylov  multisplitting)  algorithm. The  execution  time  factor
+between the two algorithms  varies from 2.2 to 1.5 times  with a network latency
+decreasing from $8.10^{-6}$ to $6.10^{-5}$.
 
-\RC{Les  2  prÃ©cÃ©dentes phrases  me  semblent en contradiction....}  
-\RCE{Reformule}
 
 \subsubsection{Network bandwidth impacts on performance}
 \ \\
@@ -694,8 +695,9 @@ more  than $75\%$  (resp.  $82\%$)  of the  execution  for  the classical  GMRES
                           & $lat$= 5.10$^{-5}$ second \\
  Input matrix size & $N_{x} \times N_{y} \times N_{z} =150 \times 150 \times 150$\\ \hline \\
  \end{tabular}
-\caption{Test conditions: Network bandwidth impacts\RC{Qu'est ce qui varie ici? Il n'y a pas de variation dans le tableau}}
-\RCE{C est le bw}
+\caption{Test conditions: Network bandwidth impacts}
+%  \RC{Qu'est ce qui varie ici? Il n'y a pas de variation dans le tableau}
+%\RCE{C est le bw}
 \label{tab:04}
 \end{table}
 
