X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/rce2015.git/blobdiff_plain/f705ba070d8b46cd38e2cdf073408f9dcfddb6ef..0f254855527c1f36a44d7ca5b39a3d8fc24654fa:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index dcdfcfa..cd6a8be 100644
--- a/paper.tex
+++ b/paper.tex
@@ -344,7 +344,7 @@ In addition, the following arguments are given to the programs at runtime:
 	\item maximum number of inner and outer iterations;
 	\item inner and outer precisions;
 	\item matrix size (N$_{x}$, N$_{y}$ and N$_{z}$);
-	\item matrix diagonal value = 6.0 (for synchronous Krylov multisplitting experiments and 6.2 for asynchronous block Jacobi experiments); \RC{CE tu vÃ©rifie, je dis ca de tÃªte}
+	\item matrix diagonal value = 6.0 (for synchronous Krylov multisplitting experiments and 6.2 for asynchronous block Jacobi experiments); \RC{CE tu vÃ©rifies, je dis ca de tÃªte}
 	\item execution mode: synchronous or asynchronous.
 \end{itemize}
 
@@ -356,11 +356,14 @@ It should also be noticed that both solvers have been executed with the Simgrid
 \section{Experimental Results}
 \label{sec:expe}
 
+In this section, experiments for both Multisplitting algorithms are reported. First the problem sued in our experiments is described.
+
+\RC{Lilia a toi de jouer}
 
 \subsection{Study setup and Simulation Methodology}
 
-To conduct our study, we have put in place the following methodology
-which can be reused for any grid-enabled applications.
+First, to conduct our study, we propose the following methodology
+which can be reused for any grid-enabled applications.\\
 
 \textbf{Step 1} : Choose with the end users the class of algorithms or
 the application to be tested. Numerical parallel iterative algorithms
@@ -369,7 +372,7 @@ have been chosen for the study in this paper. \\
 \textbf{Step 2} : Collect the software materials needed for the
 experimentation. In our case, we have two variants algorithms for the
 resolution of the 3D-Poisson problem: (1) using the classical GMRES (Algo-1); (2) and the multisplitting method (Algo-2). In addition, Simgrid simulator has been chosen to simulate the behaviors of the
-distributed applications. Simgrid is running on the Mesocentre datacenter in Franche-Comte University but also in a virtual machine on a laptop. \\
+distributed applications. Simgrid is running on the Mesocentre datacenter in the University of  Franche-Comte and also in a virtual machine on a laptop. \\
 
 \textbf{Step 3} : Fix the criteria which will be used for the future
 results comparison and analysis. In the scope of this study, we retain
