0 1 2 3 4 5 6 7 8 9 10 x 10^4

0.49

0.492

0.494

0.496

0.498 0.5 0.502

0.504

0.506

0.508

0.51

Old CI(Logistic, Logistic)

New CI(XORshift,XORshift)

n

P

Sensitivity analysis